Noise vs bias, Micron 1732-2-2 after 3x10^{14} p cm^2

Bias (volts)

Noise (electrons)

Chip 0 - one strip Chip 1 - two strips Chip 3 - two strips

Pre-irradiation values: Chip 0 Chip 1 Chip 3